-- 电磁阀数据批量插入
-- 生成时间: 2026-07-07 21:13
-- 数据来源: 设备接口返回的26个电磁阀
-- 说明: did 为控制器设备ID(全部相同), valve_code 使用 did-index 组合保证唯一

INSERT INTO fei_solenoid_valve (valve_name, valve_code, park_id, plot_id, longitude, latitude, install_location, valve_status, online_status, last_action_time, remark, is_del, create_time, update_time) VALUES
('电磁阀-1', '864865086276673-1', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-2', '864865086276673-2', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-3', '864865086276673-3', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-4', '864865086276673-4', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-5', '864865086276673-5', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-6', '864865086276673-6', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-7', '864865086276673-7', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-8', '864865086276673-8', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-9', '864865086276673-9', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-10', '864865086276673-10', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-11', '864865086276673-11', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-12', '864865086276673-12', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-13', '864865086276673-13', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-14', '864865086276673-14', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-15', '864865086276673-15', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-16', '864865086276673-16', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-17', '864865086276673-17', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-18', '864865086276673-18', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-19', '864865086276673-19', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-20', '864865086276673-20', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-21', '864865086276673-21', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-22', '864865086276673-22', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-23', '864865086276673-23', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-24', '864865086276673-24', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-25', '864865086276673-25', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW()),
('电磁阀-26', '864865086276673-26', 1, NULL, NULL, NULL, NULL, 0, 1, NULL, NULL, 0, NOW(), NOW());
